THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB's public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED "AS IS" WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2012 Cisco Systems, Inc. All rights reserved.

A through Z Commands

logging alarm

logging buffered

logging buffered filtered

logging buffered xml

logging cns-events

logging console

logging console filtered

logging console guaranteed

logging console xml

logging count

logging discriminator

logging facility

logging filter

logging history

logging history size

logging host

logging linecard

logging message-counter

logging monitor

logging monitor filtered

logging monitor xml

logging on

logging origin-id

logging persistent

logging persistent move

logging queue-limit

logging rate-limit

logging source-interface

logging synchronous

logging trap

logging userinfo

show logging persistent

logging alarm

To enable the system to send alarm messages to logging devices and to configure the alarm severity threshold, use the logging alarm command in global configuration mode. To prevent the system from sending alarm messages to a logging device, use the no form of this command.

logging alarm [severity]

no logging alarm [severity]

Syntax Description

severity

Specifies the alarm severity threshold for generating alarm messages. All alarms at and above the specified threshold generate alarm messages. One of the following values:

1 or critical--Service-affecting condition.

2 or major--Immediate action needed.

3 or minor--Minor warning conditions.

4 or informational--Informational messages.

Command Default

Alarm messages are not sent to a logging device.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.4(4)T

This command was introduced.

12.2(33)SRB

This command was integrated into Cisco IOS Release 12.2(33)SRB.

12.2(33)SCA

This command was integrated into Cisco IOS Release 12.2(33)SCA.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Cisco IOS XE Release 2.1

This command was integrated into Cisco IOS XE Release 2.1 on the Cisco ASR 1000 Series Routers.

12.2(50)SY

This command was integrated into Cisco IOS Release 12.2(50)SY.

Usage Guidelines

All alarms at and above the specified threshold generate alarm messages. If alarm severity is not specified, alarm messages for all alarm severity levels are sent to logging devices.

The following example sends messages only about critical alarms to logging devices:

Router(config)# logging alarm 1

The following example sends messages about major and critical alarms to logging devices:

Router(config)# logging alarm major

Related Commands

Command

Description

show facility-alarm

Displays the status of a generated alarm.

logging buffered

To enable system message logging to a local buffer, use the logging buffered command in global configuration mode. To cancel the use of the buffer, use the no form of this command. To return the buffer size to its default value, use the default form of this command.

logging buffered [discriminator discriminator-name] [buffer-size] [severity-level]

no logging buffered

default logging buffered

Syntax Description

discriminator

(Optional) Specifies a user-defined filter, via the logging discriminator, for syslog messages.

discriminator-name

(Optional) String of a maximum of eight alphanumeric, case-sensitive characters. Blank spaces between characters are not allowed.

buffer-size

(Optional) Size of the buffer, in bytes. The range is 4096 to 2147483647. The default size varies by platform.

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings--Warning conditions

[[5 | notifications]--Normal but significant conditions

[[6 | informational]--Informational messages

[[7 | debugging]--Debugging messages

The default logging level varies by platform but is generally 7. Level 7 means that messages at all levels (0-7) are logged to the buffer.

Command Default

Varies by platform. For most platforms, logging to the buffer is disabled by default.

Command Modes

Global configuration (config)

Command History

Release

Modification

10.0

This command was introduced.

11.1(17)T

The severity-level argument was added.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.4(11)T

The discriminator keyword and discriminator-name argument were added.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

12.2(50)SY

This command was integrated into Cisco IOS Release 12.2(50SY.

Usage Guidelines

This command copies logging messages to an internal buffer. The buffer is circular in nature, so newer messages overwrite older messages after the buffer is filled.

Specifying a severity-level causes messages at that level and numerically lower levels to be logged in an internal buffer.

The optional discriminator keyword and discriminator-name argument provide another layer of filtering that you can use to control the type and number of syslog messages that you want to receive.

When you resize the logging buffer, the existing buffer is freed and a new buffer is allocated. To prevent the router from running out of memory, do not make the buffer size too large. You can use the show memory EXEC command to view the free processor memory on the router; however, the memory value shown is the maximum available and should not be approached. The default logging buffered command resets the buffer size to the default for the platform.

UnnamedNote

On Catalyst 6500 standalone switches and Catalyst 6500 virtual switches, the default logging buffered size is 8192.

To display messages that are logged in the buffer, use the show logging command. The first message displayed is the oldest message in the buffer.

The show logging command displays the addresses and levels associated with the current logging setup and other logging statistics.

The table below shows a list of levels and corresponding syslog definitions.

Table 1
Error Message Logging Priorities and Corresponding Syslog Definitions

Level

Level Keyword

Syslog Definition

0

emergencies

LOG_EMERG

1

alerts

LOG_ALERT

2

critical

LOG_CRIT

3

errors

LOG_ERR

4

warnings

LOG_WARNING

5

notifications

LOG_NOTICE

6

informational

LOG_INFO

7

debugging

LOG_DEBUG

The following example shows how to enable standard system logging to the local syslog buffer:

Router(config)# logging buffered

The following example shows how to use a message discriminator named buffer1 to filter critical messages, meaning that messages at levels 0, 1, and 2 are filtered:

Router(config)# logging buffered discriminator buffer1 critical

Related Commands

Command

Description

clear logging

Clears messages from the logging buffer.

logging buffered xml

Enables system message logging (syslog) and sends XML-formatted logging messages to the XML-specific system buffer.

show logging

Displays the syslog.

logging buffered filtered

To enable Embedded Syslog Manager (ESM) filtered system message logging to the standard syslog buffer, use the logging buffered filtered command in global configuration mode. To disable all logging to the buffer and return the size of the buffer to the default, use the no form of this command.

logging buffered filtered [severity-level]

no logging buffered filtered

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts] --Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

The default severity level varies by platform but is generally level 7 ("debugging"), meaning that messages at all severity levels (0 through 7) are logged.

Command Default

Logging to the buffer is enabled.

ESM filtering of system logging messages sent to the buffer is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.3(2)T

This command was introduced.

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

12.2(50)SY
This command was integrated into Cisco IOS Release 12.2(50)SY.

Usage Guidelines

If standard logging has been disabled on your system (using the no logging on command), standard logging must be reenabled using the logging on command before using the logging buffered filtered command.

Standard logging is enabled by default, but filtering by the ESM is disabled by default.

ESM uses syslog filter modules, which are Tool Command Language (Tcl) script files stored locally or on a remote device. The syslog filter modules must be configured using the logging filter command before filtered output can be sent to the buffer.

When ESM filtering is enabled, all messages sent to the buffer have the configured syslog filter modules applied. To return to standard logging to the buffer, use the plain form of the logging buffered command (without the filtered keyword). To disabled all logging to the buffer, use the no logging buffered command, with or without the filtered keyword.

The buffer is circular, so newer messages overwrite older messages as the buffer is filled. To change the size of the buffer, use the logging buffered buffer-size command, then issue the logging buffered filtered command to start (or restart) filtered logging.

To display the messages that are logged in the buffer, use the show logging command in EXEC mode. The first message displayed is the oldest message in the buffer.

The following example shows how to enable ESM filtered logging to the buffer:

Router(config)# logging filter tftp://209.165.200.225/ESM/escalate.tcl
Router(config)# logging filter slot0:/email.tcl user@example.com
Router(config)# logging buffer filtered

Related Commands

Command

Description

clear logging

Clears all messages from the system message logging (syslog) buffer.

logging buffered

Enables standard system message logging (syslog) to a local buffer and sets the severity level and buffer size for the logging buffer.

logging filter

Specifies the name and location of a syslog filter module to be applied to generated system logging messages.

logging on

Globally controls (enables or disables) system message logging.

show logging

Displays the state of system message logging, followed by the contents of the logging buffer.

logging buffered xml

To enable system message logging (syslog) and send XML-formatted logging messages to the XML-specific system buffer, use the logging buffered xml command in global configuration mode . To disable the XML syslog buffer and return the size of the buffer to the default, use the no form of this command.

logging buffered xml [xml-buffer-size]

no logging buffered xml [xml-buffer-size]

Syntax Description

xml-buffer-size

(Optional) Size of the buffer, from 4,096 to 4,294,967,295 bytes (4 kilobytes to 2 gigabytes). The default size varies by platform. This value is ignored if entered as part of the no form of this command.

Command Default

XML formatting of system logging messages is disabled.

The default XML syslog buffer size is the same size as the standard syslog buffer.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.2(15)T

This command was introduced.

12.2(28)SB

This command was integrated into Cisco IOS Release 12.2(28)SB.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

Standard logging is enabled by default, but XML-formatted system message logging is disabled by default. If standard logging has been disabled on your system (using the no logging on command), standard logging must be reenabled using the logging on command before using the logging buffered xml command.

The logging buffered xml command copies logging messages to an internal XML buffer. The XML syslog buffer is separate from the standard syslog buffer (created using the logging buffered command).

The buffer is circular, so newer messages overwrite older messages as the buffer is filled.

The severity level for logged messages is determined by the setting of the logging buffered command. If the logging buffered command has not been used, the default severity level for that command is used. The default severity level varies by platform, but is generally level 7 ("debugging"), meaning that messages at all severity levels (0 through 7) are logged. For more information on severity levels, see the documentation of the logging buffered command.

When you resize the logging buffer, the existing buffer is freed and a new buffer is allocated. Do not make the buffer size too large because the router could run out of memory for other tasks. You can use the show memory command in EXEC mode to view the free processor memory on the router; however, this value is the maximum available and should not be approached.

To return the size of the XML logging buffer to the default, use the no logging buffered xml command.

To display the messages that are logged in the buffer, use the show logging xml command in EXEC mode. The first message displayed is the oldest message in the buffer.

In the following example, the user enables logging to the XML syslog buffer and sets the XML syslog buffer size to 14 kilobytes:

Router(config)# logging buffered xml 14336

Related Commands

Command

Description

clear logging xml

Clears all messages from the XML-specific system message logging (syslog) buffer.

logging buffered

Enables standard system message logging (syslog) to a local buffer and sets the severity level and buffer size for the logging buffer.

logging on

Globally controls (enables or disables) system message logging.

show logging xml

Displays the state of XML-formatted system message logging, followed by the contents of the XML-specific buffer.

logging cns-events

To enable extensible markup language (XML)-formatted system event message logging to be sent through the Cisco Networking Services (CNS) event bus, use the logging cns-events command in global configuration mode. To disable the ability to send system logging event messages through the CNS event bus, use the no form of this command.

logging cns-events [severity-level]

no logging cns-events

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies] --System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Command Default

Level 7: debugging

Command Modes

Global configuration (config)

Command History

Release

Modification

12.2(2)T

This command was introduced.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

12.2(33)SXI

This command was integrated into Cisco IOS Release 12.2(33)SXI.

Usage Guidelines

Before you configure this command you must enable the CNS event agent with the cns event command because the CNS event agent sends out the CNS event logging messages. The generation of many CNS event logging messages can negatively impact the publishing time of standard CNS event messages that must be sent to the network.

If the debug cns event command is active when the logging cns-events command is configured, the logging of CNS events is disabled.

In the following example, the user enables XML-formatted CNS system error message logging to the CNS event bus for messages at levels 0 through 4:

Router(config)# logging cns-events 4

Related Commands

Command

Description

cns event

Configures CNS event gateway, which provides CNS event services to Cisco IOS clients.

debug cns event

Displays CNS event agent debugging messages.

logging console

To send system logging (syslog) messages to all available TTY lines and limit messages based on severity, use the logging console command in global configuration mode. To disable logging to the console terminal, use the no form of this command.

logging console [discriminator discr-name] [severity-level]

no logging console

Syntax Description

discriminator

(Optional) Specifies a user-defined filter, via the logging discriminator, for syslog messages.

discr-name

(Optional) String of a maximum of eight alphanumeric, case-sensitive characters. Blank spaces between characters are not allowed.

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Level 7 is the default.

Command Default

The default varies by platform. In general, the default is to log all messages.

Command Modes

Global configuration (config)

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.4(11)T

The discriminator keyword and discr-name argument were added.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

The logging console command includes all the TTY lines in the device, not only the console TTY. For example, if you are running the debug ip rip command from a Telnet session to a VTY TTY on a router and you configure no logging console, the debugging messages will not appear in your Telnet command-line interface (CLI) session.

Specifying a level causes messages at that level and numerically lower levels to be sent to the console (TTY lines).

The optional discriminator keyword and discr-name argument provide another layer of filtering that you can use to control the type and number of syslog messages that you want to receive.

UnnamedCaution

The console is a slow display device. In message storms some logging messages may be silently dropped when the console queue becomes full. Set severity levels accordingly.

The show logging EXEC command displays the addresses and levels associated with the current logging setup and other logging statistics.

The table below shows a list of levels and corresponding syslog definitions.

Table 2
Error Message Logging Priorities and Corresponding Syslog Definitions

Level

Level Keyword

Syslog Definition

0

emergencies

LOG_EMERG

1

alerts

LOG_ALERT

2

critical

LOG_CRIT

3

errors

LOG_ERR

4

warnings

LOG_WARNING

5

notifications

LOG_NOTICE

6

informational

LOG_INFO

7

debugging

LOG_DEBUG

UnnamedNote

The behavior of the log keyword that is supported by some access lists such as IP extended, IP expanded, and IPX extended depends on the setting of the logging console command. The log keyword takes effect only if the logging console level is set to 6 or 7. If you change the default to a level lower than 6 and specify the log keyword with the IP access list (extended) command, no information is logged or displayed.

The following example shows how to change the level of messages sent to the console terminal (TTY lines) to alerts, meaning that messages at levels 0 and 1 are sent:

Router(config)# logging console alerts

The following example shows how to use a discriminator named msglog1 to filter alerts, meaning that messages at levels 0 and 1 are filtered:

Router(config)# logging console discriminator msglog1 alerts

Related Commands

Command

Description

access-list (extended)

Defines an extended XNS access list.

logging facility

Configures the syslog facility in which error messages are sent.

logging console filtered

To enable Embedded Syslog Monitor (ESM) filtered system message logging to the console connections, use the logging console filtered command in global configuration mode. To disable all logging to the console connections, use the no form of this command.

logging console filtered [severity-level]

no logging console

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

The default severity level varies by platform but is generally level 7 ("debugging"), meaning that messages at all severity levels (0 through 7) are logged.

Command Default

Logging to the console is enabled.

ESM filtering of system logging messages sent to the console is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.3(2)T

This command was introduced.

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

If standard logging has been disabled on your system (using the no logging on command), standard logging must be reenabled using the logging on command before using the logging console filtered command.

Standard logging is enabled by default, but filtering by the ESM is disabled by default.

ESM uses syslog filter modules, which are Tool Command Language (Tcl) script files stored locally or on a remote device. The syslog filter modules must be configured using the logging filter command before system logging messages can be filtered.

When ESM filtering is enabled, all messages sent to the console have the configured syslog filter modules applied. To disable filtered logging to the console and return to standard logging, use the standard logging console command (without the filteredkeyword). To disable all logging to the console, use the no logging console command, with or without the filtered keyword.

The following example shows how to enable ESM filtered logging to the console for severity levels 0 through 3:

Router(config)# logging filter tftp://209.165.200.225/ESM/escalate.tcl

Router(config)# logging filter slot0:/email.tcl user@example.com

Router(config)# logging console filtered 3

Related Commands

Command

Description

logging console

Enables standard system message logging (syslog) to all console (CTY) connections and sets the severity level.

logging filter

Specifies the name and location of a syslog filter module to be applied to generated system logging messages.

logging on

Globally controls (enables or disables) system message logging.

show logging

Displays the state of system message logging, followed by the contents of the logging buffer.

logging console guaranteed

To guarantee the system message logging to the console, use the logging console guaranteed command in global configuration mode. To disable guaranteed logging to the console, use the no form of this command.

logging console guaranteed

no logging console guaranteed

Syntax Description

This command has no arguments or keywords.

Command Default

Guaranteed logging to the console is enabled by default.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.0

This command was introduced.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

Guaranteed output of debugging information is useful. By default, guaranteed system message logging to the console is enabled.

If the amount of console debugging is too large, Cisco IOS software will periodically stop all functions except providing the debug message output. This guaranteed output of debugging information can be useful, but it can also cause certain time-critical functions of Cisco IOS software to fail. To disable the guarantee of console logging, use the no form of the command.

UnnamedNote

Guaranteed console logging is not applicable to syslog.

The following example shows how to enable the guaranteed console logging:

Router(config)# logging console guaranteed

Related Commands

Command

Description

logging console

Enables standard system message logging (syslog) to all console (TTY) connections and sets the severity level.

show logging

Displays the state of system message logging, followed by the contents of the logging buffer.

logging console xml

To enable XML-formatted system message logging to the console connections, use the logging console xml command in global configuration mode. To disable all logging to the console connections, use the no form of this command.

logging console xml [severity-level]

no logging console xml

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Command Default

Logging to the console is enabled.

XML-formatted logging to the console is disabled.

The default severity level varies by platform, but is generally level 7 (messages at levels 0 through 7 are logged).

Command Modes

Global configuration

Command History

Release

Modification

12.2(15)T

This command was introduced.

12.2(28)SB

This command was integrated into Cisco IOS Release 12.2(28)SB.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

To return system logging messages to standard text (without XML formatting), issue the standard logging console command (without the xml keyword extension).

In the following example, the user enables XML-formatted system message logging to the console for messages at levels 0 through 4:

Router(config)# logging console xml 4

Related Commands

Command

Description

show logging xml

Displays the state of XML-formatted system message logging, followed by the contents of the XML syslog buffer.

logging count

To enable the error log count capability, use the logging count command in global configuration mode. To disable the error log count capability, use the no form of this command.

logging count

no logging count

Syntax Description

This command has no arguments or keywords.

Command Default

This command is disabled.

Command Modes

Global configuration

Command History

Release

Modification

12.2(8)T

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The logging count command counts every syslog message and time-stamps the occurrence of each message.

In the following example, syslog messages are logged to the system buffer and the logging count capability is enabled:

Router(config)# logging buffered notifications
Router(config)# logging count
Router(config)# end
Router# show logging count

Facility       Message Name                     Sev Occur   Last Time
                        =============================================================================
SYS            BOOTTIME                          6    1     00:00:12
SYS            RESTART                           5    1     00:00:11
SYS            CONFIG_I                          5    3     1d00h
-------------  -------------------------------  -----------------------------
SYS TOTAL                                              5
LINEPROTO      UPDOWN                             5   13 00:00:19
-------------  -------------------------------  -----------------------------
LINEPROTO TOTAL                                       13
LINK           UPDOWN                             3    1 00:00:18
LINK           CHANGED                            5   12 00:00:09
-------------  -------------------------------  -----------------------------
LINK TOTAL                                            13
SNMP           COLDSTART                          5    1 00:00:11
-------------  -------------------------------  -----------------------------
SNMP TOTAL

Related Commands

Command

Description

show logging

Displays the state of system logging (syslog).

logging discriminator

To create a syslog message discriminator, use the logging discriminator command in global configuration mode. To disable the syslog message discriminator, use the no form of this command.

logging discriminator discr-name [ [facility] [mnemonics] [msg-body] {drops string | includes string}] [severity {drops sev-num | includes sev-num}] [rate-limit msglimit]

no logging discriminator discr-name

Syntax Description

discr-name

String of a maximum of eight alphanumeric, case-sensitive characters. Blank spaces between characters are not allowed.

facility

(Optional) Message subfilter for the facility pattern in an event message.

mnemonics

(Optional) Message subfilter for the mnemonic pattern in an event message.

msg-body

(Optional) Message subfilter for the msg-body pattern in an event message.

drops

Drops messages that match the pattern, including the specified regular expression.

includes

Delivers messages that match the pattern, including the specified regular expression string.

string

(Optional) Expression used for message filtering.

severity

(Optional) Message subfilter by severity level or group.

sev-num

(Optional) Integer that identifies the severity level or multiple levels. Multiple levels must be separated with a comma (,).

rate-limit

(Optional) Specifies a number of messages to be processed within a unit of time.

msglimit

(Optional) Integer in the range of 1 to 10000 that identifies the number of messages not to be exceeded.

Command Default

The logging discriminator function is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.4(11)T

This command was introduced.

12.2(33)SRB

This command was integrated into Cisco IOS Release 12.2(33)SRB.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

12.2(33)SXI

This command was integrated into Cisco IOS Release 12.2(33)SXI.

Usage Guidelines

If you enter a discriminator name that was previously specified, your entry is treated as a modification to the discriminator. The modification becomes effective when the configuration is completed. All associated sessions will use the modified value. When you remove a discriminator, the associations of all entries in the logging host list are removed.

When you issue theno logging discriminator command and the discriminator name is not found, an error message is generated. If the discriminator name is valid and actively associated with syslog sessions, the effect is immediate; the next syslog message to be processed will go through.

Subfilters are checked in the following order. If a message is dropped by any of the subfilters, the remaining checks are skipped.

Severity level or levels specified

Facility within the message body that matches a regular expression

Mnemonic that matches a regular expression

Part of the body of a message that matches a regular expression

Rate-limit

The following example shows how to enable the logging discriminator named msglog01 to filter messages with a severity level of 5.

Router(config)# logging discriminator msglog01 severity includes 5

Related Commands

Command

Description

logging monitor

Enables system message logging to the terminal lines (monitor connections).

logging facility

To configure the syslog facility in which error messages are sent, use the logging facility command in global configuration mode. To revert to the default of local7, use the no form of this command.

logging facility facility-type

no logging facility

Syntax Description

facility-type

Syslog facility. See the "Usage Guidelines" section of this command reference entry for descriptions of acceptable keywords.

Command Default

local7

Command Modes

Global configuration (config)

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The table below describes the acceptable keywords for the facility-type argument.

Table 3
logging facility facility-type Argument

Facility-type keyword

Description

auth

Authorization system

cron

Cron facility

daemon

System daemon

kern

Kernel

local0-7

Reserved for locally defined messages

lpr

Line printer system

mail

Mail system

news

USENET news

sys9

System use

sys10

System use

sys11

System use

sys12

System use

sys13

System use

sys14

System use

syslog

System log

user

User process

uucp

UNIX-to-UNIX copy system

In the following example, the user configures the syslog facility to the kernel facility type:

Router(config)# logging facility kern

Related Commands

Command

Description

logging console

Limits messages logged to the console based on severity.

logging filter

To specify a syslog filter module to be used by the Embedded Syslog Manager (ESM), use the logging filter command in global configuration mode. To remove a module from the filter chain, use the no form of this command.

logging filter filter-url [position] [args filter-arguments]

no logging filter filter-url

Syntax Description

filter-url

Specifies the location of the syslog filter module (script file), using the standard Cisco IOS File System URL syntax.

The location can be a local memory location, such as flash: or slot0:, or a remote file server system, such as tftp:, ftp:, or rcp:.

The filter-url should include the name of the syslog filter module, such as email.tcl or email.txt.

position

(Optional) An integer that specifies the order in which the syslog filter modules should be executed. The valid value for this argument is n + 1, where n is the current number of configured filters.

If this argument is omitted, the specified module will be positioned as the last module in the chain (the nth+1 position).

args filter-arguments

(Optional) Adds values to be passed by the ESM file chain. The ESM filter modules will determine what arguments you should use.

Command Default

No ESM filters are applied to system logging messages.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.3(2)T

This command was introduced.

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

Use this command to enable the Embedded Syslog Manager by specifying the filter that should be applied to logging messages generated by the system. Repeat this command for each syslog filter module that should be used.

Syslog filter modules are Tool Command Language (Tcl) script files. These files can be stored as plain text files (.txt) or as precompiled Tcl scripts (.tcl). When you position (order) the modules, remember that the output of each filter module is used as input for the next filter module in the chain.

By default, syslog filter modules are executed in the order in which they appear in the system configuration file. The position argument can be used to order the filter modules manually. You can also reorder the filter modules at any time by reentering the logging filter command and specifying a different position for a given filter module.

The optional args filter-arguments syntax can be added to pass arguments to the specified filter. Multiple arguments can be specified. The number and type of arguments should be defined in the syslog filter module. For example, if the syslog filter module is designed to accept a specific e-mail address as an argument, you could pass the e-mail address using the args user@host.com syntax. Multiple arguments are typically delimited by spaces.

To remove a module from the list of modules to be executed, use the no form of this command. Modules not referenced in the configuration will not be executed, regardless of their "position" number.

The following example shows how to enable ESM filtered logging to the console for severity levels 0 through 3:

Router(config)# logging filter tftp://209.165.200.225/ESM/escalate.tcl
Router(config)# logging filter slot0:/email.tcl user@example.com
Router(config)# logging filter slot0:/email_guts.tcl

Router(config)# logging console filtered 3

Related Commands

Command

Description

logging buffer filtered

Enables ESM filtered system message logging to the system logging buffer.

logging console filtered

Enables ESM filtered system message logging to all console connections.

logging host

Enables system message logging to a remote host (syslog collector).

logging monitor filtered

Enables ESM filtered system message logging to all monitor (TTY) connections.

show logging

Displays the status of system message logging, followed by the contents of the logging buffer.

logging history

To limit syslog messages sent to the router's history table and to an SNMP network management station based on severity, use the logging history command in global configuration mode . To return the logging of syslog messages to the default level, use the no form of this command with the previously configured severity level argument.

logging history [severity-level-name | severity-level-number]

no logging history [severity-level-name | severity-level-number]

Syntax Description

severity-level-name

Name of the severity level. Specifies the lowest severity level for system error message logging. See the "Usage Guidelines" section of this command for available keywords.

severity-level-number

Number of the severity level. Specifies the lowest severity level for system error message logging. See the "Usage Guidelines" section of this command for available keywords.

Command Default

Logging of error messages of severity levels 0 through 4 (emergency, alert, critical, error, and warning levels); in other words, "saving level warnings or higher."

Command Modes

Global configuration (config)

Command History

Release

Modification

11.2

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The sending of syslog messages to an SNMP network management station (NMS) occurs when you enable syslog traps with the snmp-server enable traps syslog global configuration mode command.

Because SNMP traps are potentially unreliable, at least one syslog message, the most recent message, is stored in a history table on the router. The history table, which contains table size, message status, and message text data, can be viewed using the show logging history command. The number of messages stored in the table is governed by the logging history size global configuration mode command.

Severity levels are numbered 0 through 7, with 0 being the highest severity level and 7 being the lowest severity level (that is, the lower the number, the more critical the message). Specifying a level causes messages at that severity level and numerically lower levels to be stored in the router's history table and sent to the SNMP network management station. For example, specifying the level critical causes messages as the critical (3), alert (2), and emergency (1) levles to be saved to the logging history table.

The table below provides a description of logging severity levels, listed from higest severity to lowest severity, and the arguments used in the logging history command syntax. Note that you can use the level name or the level number as the level argument in this command.

Table 4
Syslog Error Message Severity Levels

Severity Level Name

Severity Level Number

Description

Syslog Definition

emergencies

0

System unusable

LOG_EMERG

alerts

1

Immediate action needed

LOG_ALERT

critical

2

Critical conditions

LOG_CRIT

errors

3

Error conditions

LOG_ERR

warnings

4

Warning conditions

LOG_WARNING

notifications

5

Normal but significant condition

LOG_NOTICE

informational

6

Informational messages only

LOG_INFO

debugging

7

Debugging messages

LOG_DEBUG

In the following example, the system is initially configured to the default of saving severity level 4 or higher. The logging history 1 command is used to configure the system to save only level 1 (alert) and level 0 (emergency) messages to the logging history table, and, by extension, to send only these levels in the SNMP notifications. The configuration is then confirmed using the show logging history command.

Router# show logging history

Syslog History Table:10 maximum table entries,
! The following line shows that system-error-message-logging is set to the
! default level of "warnings" (4).
saving level warnings or higher
 23 messages ignored, 0 dropped, 0 recursion drops
 1 table entries flushed
 SNMP notifications not enabled
   entry number 2 : LINK-3-UPDOWN
    Interface FastEthernet0, changed state to up
    timestamp: 2766
Router# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.
Router(config)# logging history 1
Router(config)# snmp-server enable traps syslog

Router(config)# end
Router#
4w0d: %SYS-5-CONFIG_I: Configured from console by console
Router# show logging history
Syslog History Table:1 maximum table entries,
! The following line indicates that 'logging history level 1' (alerts) is configured.
saving level alerts or higher
 18 messages ignored, 0 dropped, 0 recursion drops
 1 table entries flushed
 SNMP notifications enabled, 0 notifications sent
   entry number 2 : LINK-3-UPDOWN
    Interface FastEthernet0, changed state to up
    timestamp: 2766
Router#

Related Commands

Command

Description

logging history size

Sets the maximum number of syslog messages that can be stored in the router's syslog history table.

logging on

Controls (enables or disables) the logging of error messages.

show logging

Displays the state of system logging (syslog) and contents of the local logging buffer.

show logging history

Displays information about the system logging history table.

snmp-server enable traps syslog

Controls (enables or disables) the sending of SYSLOG MIB notifications.

snmp-server host

Specifies the recipient of an SNMP notification operation.

logging history size

To change the number of syslog messages stored in the router's history table, use the logging history size command in global configuration mode. To return the number of messages to the default value, use the no form of this command.

logging history size number

no logging history size

Syntax Description

number

Number from 1 to 500 that indicates the maximum number of messages stored in the history table. The default is one message.

Command Default

One message

Command Modes

Global configuration (config)

Command History

Release

Modification

11.2

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

When the history table is full (that is, it contains the maximum number of message entries specified with the logging history size command), the oldest message entry is deleted from the table to allow the new message entry to be stored.

In the following example, the user sets the number of messages stored in the history table to 20:

logging history size 20

Related Commands

Command

Description

logging history

Limits syslog messages sent to the router's history table and the SNMP network management station based on severity.

show logging

Displays the state of logging (syslog).

logging host

To log system messages and debug output to a remote host, use the logging host command in global configuration mode. To remove a specified logging host from the configuration, use the no form of this command.

logging host {{ip-address | hostname} [vrf vrf-name] | ipv6 {ipv6-address | hostname}} [discriminator discr-name | [filtered [stream stream-id] | xml]] [transport {[beep [audit] [channel chnl-number] [sasl profile-name] [tls cipher [cipher-num] trustpoint trustpt-name]] | tcp [audit] | udp} [port port-num]] [sequence-num-session] [session-id {hostname | ipv4 | ipv6 | string custom-string}]

no logging host {{ip-address | hostname} | ipv6 {ipv6-address | hostname}}

Syntax Description

ip-address

IP address of the host that will receive the system logging (syslog) messages.

hostname

Name of the IP or IPv6 host that will receive the syslog messages.

vrf vrf-name

(Optional) Specifies a VPN routing and forwarding instance (VRF) that connects to the syslog server host. Name of the VRF that connects to the syslog server host.

ipv6

Indicates that an IPv6 address will be used for a host that will receive the syslog messages.

ipv6-address

IPv6 address of the host that will receive the syslog messages.

discriminator discr-name

(Optional) Specifies a message discriminator for the session. Name of the message discriminator.

filtered

(Optional) Specifies that logging messages sent to this host should first be filtered by the Embedded Syslog Manager (ESM) syslog filter modules specified in the logging filter commands.

stream stream-id

(Optional) Specifies that only ESM filtered messages with the stream identification number specified in the stream-id argument should be sent to this host. Number from 10 to 65535 that identifies the message stream.

xml

(Optional) Specifies that the logging output should be tagged using the XML tags defined by Cisco.

transport

(Optional) Method of transport to be used. UDP is the default.

beep

(Optional) Specifies that the Blocks Extensible Exchange Protocol (BEEP) transport will be used.

audit

(Optional) Available only for BEEP and TCP. When the audit keyword is used, the specified host is identified for firewall audit logging.

channel chnl-number

(Optional) Specifies the BEEP channel number to use. Number of the BEEP channel. Valid values are 1, 3, 5, 7, 9, 11, 13, and 15. The default is 1.

sasl

(Optional) Applies the Simple Authentication and Security Layer (SASL) BEEP profile.

profile-name

(Optional) Name of the SASL profile.

tls cipher

(Optional) Specifies the cipher suites to be used for a connection. Cipher suites are referred to by mask values. Multiple cipher suites can be chosen by adding the mask values. The tls cipher cipher-num keyword and argument pair is available only in crypto images.

cipher-num

(Optional) Integer from 32 to 224 that is the mask value of a cipher suite (sum of up to three numbers: 32, 64, and 128) and refers to the following:

ENC_FLAG_TLS_RSA_WITH_NULL_SHA - 32

ENC_FLAG_TLS_RSA_WITH_RC4_128_MD5 - 64

ENC_FLAG_TLS_RSA_WITH_AES_128_CBC_SHA - 128

The tls cipher cipher-num keyword and argument pair is available only in crypto images.

trustpoint trustpt-name

(Optional) Specifies a trustpoint for identity information and certificates. The trustpoint trustpt-name keyword and argument pair is available only in crypto images. Name of the trustpoint. If you previously declared the trustpoint and want only to update its characteristics, specify the name you previously created. The trustpoint trustpt-name keyword and argument pair is available only in crypto images.

tcp

(Optional) Specifies that the TCP transport will be used.

udp

(Optional) Specifies that the UDP transport will be used.

port port-number

(Optional) Specifies that a port will be used.

Integer from 1 through 65535 that defines the port.

If a port number is not specified, the standard Cisco default port number for TCP is 601, for BEEP is 601, and for UDP is 514.

sequence-num-session

(Optional) Includes a session sequence number tag in the syslog message.

session-id

(Optional) Specifies syslog message session ID tagging.

hostname

Includes the hostname in the session ID tag.

ipv4

Includes the logging source IP address in the session ID tag.

ipv6

Includes the logging source IPv6 address in the session ID tag.

string custom-string

Includes the custom string in the session ID tag.

Custom string in the s_id="custom_string" tag.

Command Default

System logging messages are not sent to any remote host. When this command is entered without the xml or filtered keyword, messages are sent in the standard format.

Command Modes

Global configuration (config)

Command History

T Release

Modification

10.0

The logging command was introduced.

12.2(15)T

The logging host command replaced the logging command. The xml keyword was added.

12.3(2)T

The filtered [stream] stream-id syntax was added as part of the ESM feature.

12.3(14)T

The trasport keyword was added.

12.4(4)T

The ipv6 ipv6-address keyword-argument pair was added.

12.4(11)T

Support for BEEP and the discriminator, sequence-num-session, and session-id keywords and discr-name argument was added.

S Release

Modification

12.0(14)S

The logging host command replaced the logging command.

12.0(14)ST

The logging host command replaced the logging command.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S and the vrf vrf-name keyword-argument pair was added.

SR Release

Modification

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA. The vrf vrf-name and xml keywords were supported.

SX Release

Modification

12.2(33)SXH

This command was integrated into Cisco IOS Release 12.2(33)SXH. Support was added for vrf vrf-name and xml keywords and argument.

12.2(33)SXI

Support for BEEP and the discriminator, sequence-num-session, and session-id keywords and discr-name argument were added.

XE Release

Modification

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

SB Release

Modification

12.2(28)SB

This command was integrated into Cisco IOS Release 12.2(28)SB. Support was added for the vrf vrf-name and xml keywords and argument.

12.2(31)SB2

This command was implemented on the Cisco 10000 series routers. Support was added for the vrf vrf-name and xml keywords and argument.

Usage Guidelines

Standard system logging is enabled by default. If logging is disabled on your system (using the no logging on command), you must enter the logging on command to reenable logging before you can use the logging host command.

The logging host command identifies a remote host (usually a device serving as a syslog server) to receive logging messages. By issuing this command more than once, you can build a list of hosts that receive logging messages.

To specify the severity level for logging to all hosts, use the logging trap command.

Use the vrf vrf-name keyword and argument to enable a syslog client (a provider edge [PE] router) to send syslog messages to a syslog server host connected through a VRF interface. To delete the configuration of the syslog server host from the VRF, use the no logging host command with the vrf vrf-name keyword and argument.

When XML-formatted syslog is enabled using the logging host command with the xml keyword, messages are sent to the specified host with the system-defined XML tags. These tags are predefined and cannot be configured by a user. XML formatting is not applied to debug output.

If you are using the ESM feature, you can enable ESM-filtered syslog messages to be sent to one or more hosts using the logging host filtered command. To use the ESM feature, you must first specify the syslog filter modules that should be applied to the messages using the logging filter command. See the description of the logging filter command for more information about the ESM feature.

UnnamedNote

ESM and message discriminator usage is mutually exclusive in a given syslog session.

Using the BEEP transport protocol, you can have reliable and secure delivery for syslog messages and configure multiple sessions over eight BEEP channels. The sasl profile-name, tls cipher cipher-num, trustpoint trustpt-name keywords and arguments are available only in crypto images.

To configure standard logging to a specific host after configuring XML-formatted or ESM-filtered logging to that host, use the logging host command without the xml or filtered keyword. Issuing the standard logging host command replaces an XML- or ESM-filtered logging host command, and vice versa, if the same host is specified.

You can configure the system to send standard messages to one or more hosts, XML-formatted messages to one or more hosts, and ESM-filtered messages to one or more hosts by repeating this command as many times as desired with the appropriate syntax. (See the "Examples" section.)

When the no logging host command is issued with or without the optional keywords, all logging to the specified host is disabled.

In the following example, messages at severity levels 0 (emergencies) through 5 (notifications) (logging trap command severity levels) are logged to a host at 192.168.202.169:

Router(config)# logging host 192.168.202.169

Router(config)# logging trap 5

In the following example, standard system logging messages are sent to the host at 192.168.200.225, XML-formatted system logging messages are sent to the host at 192.168.200.226, ESM-filtered logging messages with the stream 10 value are sent to the host at 192.168.200.227, and ESM-filtered logging messages with the stream 20 value are sent to host at 192.168.202.129:

Router(config)# logging host 192.168.200.225

Router(config)# logging host 192.168.200.226 xml

Router(config)# logging host 192.168.200.227 filtered stream 10

Router(config)# logging host 192.168.202.129 filtered stream 20

In the following example, messages are logged to a host with an IP address of 172.16.150.63 connected through a VRF named vpn1:

Router(config)# logging host 172.16.150.63 vrf vpn1

In the following example, the default UDP on an IPv6 server is set because no port number is specified. The default port number of 514 is used:

Router(config)# logging host ipv6 AAAA:BBBB:CCCC:DDDD::FFFF

In the following example, TCP port 1774 on an IPv6 server is set:

Router(config)# logging host ipv6 BBBB:CCCC:DDDD:FFFF::1234 transport tcp port 1774

In the following example, the UDP port default is used on an IPv6 server with a hostname of v6-hostname:

Router(config)# logging host ipv6 v6-hostname transport udp port 514

In the following example, a message discriminator named fltr1 is specified along with the BEEP protocol for port 600 and channel 3.

Router(config)# logging host host2 dicriminator fltr1 transport beep channel 3 port 600

Related Commands

Command

Description

logging filter

Specifies a syslog filter module to be used by the ESM.

logging on

Globally controls (enables or disables) system message logging.

logging trap

Limits messages sent to the syslog servers based on severity level.

show logging

Displays the state of system message logging, followed by the contents of the standard syslog buffer.

show logging xml

Displays the state of XML-formatted system message logging, followed by the contents of the XML syslog buffer.

logging linecard

To log messages to an internal buffer on a line card, use the logging linecard command in global configuration mode. To cancel the use of the internal buffer on the line cards, use the no form of this command.

logging linecard [size | level]

no logging linecard

Syntax Description

size

(Optional) Size of the buffer used for each line card. The range is from 4096 to 65,536 bytes. The default is 8 KB.

level

(Optional) Limits the logging of messages displayed on the console terminal to a specified level. The message level can be one of the following:

alerts --Immediate action needed

critical --Critical conditions

debugging --Debugging messages

emergencies --System is unusable

errors --Error conditions

informational --Informational messages

notifications --Normal but significant conditions

warnings --Warning conditions

Command Default

The Cisco IOS software logs messages to the internal buffer on the GRP card.

Command Modes

Global configuration (config)

Command History

Release

Modification

11.2 GS

This command was added to support the Cisco 12000 series Gigabit Switch Routers.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

Specifying a message level causes messages at that level and numerically lower levels to be stored in the internal buffer on the line cards.

The table below lists the message levels and associated numerical level. For example, if you specify a message level of critical, all critical, alert, and emergency messages will be logged.

Table 5
Message Levels

Level Keyword

Level

emergencies

0

alerts

1

critical

2

errors

3

warnings

4

notifications

5

informational

6

debugging

7

To display the messages that are logged in the buffer, use the show logging slot EXEC command. The first message displayed is the oldest message in the buffer.

Do not make the buffer size too large because the router could run out of memory for other tasks. You can use the show memory EXEC command to view the free processor memory on the router; however, this is the maximum available and should not be approached.

The following example enables logging to an internal buffer on the line cards using the default buffer size and logging warning, error, critical, alert, and emergency messages:

Router(config)# logging linecard warnings

Related Commands

Command

Description

clear logging

Clears messages from the logging buffer.

show logging

Displays the state of logging (syslog).

logging message-counter

To enable logging of debug, log, or syslog messages, use the logging message-counter command in global configuration mode. To disable logging for these message types, use the no form of this command.

logging message-counter {debug | log | syslog}

no logging message-counter {debug | log | syslog}

Syntax Description

debug

Enables the debug information message counter, which is a counter of accumulated debug information messages received by the logger.

log

Enables all message counters of accumulated logging messages received by the logger.

syslog

Enables the syslog message counter, which is a counter of current lines of syslog messages sent. This counter is enabled by default.

Command Default

The logging message counter function is disable d.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.4(11)T

This command was introduced.

12.2(33)SRB

This command was integrated into Cisco IOS Release 12.2(33)SRB.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

12.2(33)SXI

This command was integrated into Cisco IOS Release 12.2(33)SXI.

Usage Guidelines

Use this command to help identify where event messages are being dropped because of rate limiting or to exclude the syslog counter from a syslog message.

The following example shows how to enable the syslog message counter:

Router(config)# logging message-counter syslog

logging monitor

To enable system message logging to the terminal lines (monitor connections), use the logging monitorcommand in global configuration mode. To disable logging to terminal lines other than the console line, use the no form of this command.

logging monitor [discriminator discr-name] [severity-level]

no logging monitor

Syntax Description

discriminator

(Optional) Specifies a user-defined filter, via the logging discriminator, for syslog messages.

discr-name

(Optional) String of a maximum of eight alphanumeric, case-sensitive characters. Blank spaces between characters are not allowed.

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Level 7 is the default.

Command Default

The logging monitor function is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.4(11)T

The discriminator keyword and discr-name argument were added.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

Specifying a severity-level causes messages both at that level and at numerically lower levels to be displayed to the monitor. The table below shows a list of levels and corresponding syslog definitions.

Table 6
Error Message Logging Priorities and Corresponding Syslog Definitions

Level

Level Keyword

Syslog Definition

0

emergencies

LOG_EMERG

1

alerts

LOG_ALERT

2

critical

LOG_CRIT

3

errors

LOG_ERR

4

warnings

LOG_WARNING

5

notifications

LOG_NOTICE

6

informational

LOG_INFO

7

debugging

LOG_DEBUG

The following example shows how to specify that messages at levels 3 (errors), 2 (critical), 1 (alerts), and 0 (emergencies) be logged to monitor connections:

Router(config)# logging monitor 3

The following example shows how to use a discriminator named monitor1 to filter critical messages, meaning that messages at levels 0, 1, and 2 are filtered:

Router(config)# logging monitor discriminator monitor1 critical

Related Commands

Command

Description

logging monitor filtered

Enables ESM filtered system message logging to monitor connections.

logging monitor xml

Applies XML formatting to messages logged to the monitor connections.

terminal monitor

Displays debug command output and system error messages for the current terminal and session.

logging monitor filtered

To enable Embedded Syslog Manager (ESM) filtered system message logging to monitor connections, use the logging monitor filtered command in global configuration mode. To disable all logging to the monitor connections, use the no form of this command.

logging monitor filtered [severity-level]

no logging monitor filtered

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

The default severity level varies by platform but is generally level 7 ("debugging"), meaning that messages at all severity levels (0 through 7) are logged.

Command Default

Logging to monitor connections is enabled.

ESM filtering of system logging messages sent to the monitor connections is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.3(2)T

This command was introduced.

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

The monitor keyword specifies the TTY (TeleTYpe) line connections at all line ports. TTY lines (also called ports) communicate with peripheral devices such as terminals, modems, and serial printers. An example of a TTY connection is a PC with a terminal emulation program connected to the device using a dialup modem, or a Telnet connection.

Standard logging is enabled by default, but filtering by the ESM is disabled by default. If standard logging has been disabled on your system (using the no logging on command), standard logging must be reenabled using the logging on command before using the logging monitor filtered command.

ESM uses syslog filter modules, which are Tool Command Language (Tcl) script files stored locally or on a remote device. The syslog filter modules must be configured using the logging filter command before system logging messages can be filtered.

When ESM filtering is enabled, all messages sent to the monitor have the configured syslog filter modules applied. To disable filtered logging to the monitor and return to standard logging, issue the standard logging monitor command (without the filtered keyword). To disable all logging to the monitor connections, use the no logging monitor command, with or without the filtered keyword.

The following example shows how to enable ESM filtered logging to the monitor connections:

Router(config)# logging filter tftp://209.165.200.225/ESM/escalate.tcl

Router(config)# logging filter slot0:/email.tcl user@example.com

Router(config)# logging monitor filtered

Related Commands

Command

Description

logging monitor

Enables standard system message logging to all monitor (TTY) connections.

show logging xml

Displays the state of XML-formatted system message logging, followed by the contents of the XML syslog buffer.

logging monitor xml

To enable XML-formatted system message logging to monitor connections, use the logging console xml command in global configuration mode. To disable all logging to the monitor connections, use the no form of this command.

logging monitor xml [severity-level]

no logging monitor xml

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Command Default

Logging to monitor connections is enabled.

XML-formatted logging to monitor connections is disabled.

The default severity level varies by platform, but is generally level 7 (messages at levels 0 through 7 are logged).

Command Modes

Global configuration (config)

Command History

Release

Modification

12.2(15)T

This command was introduced.

12.2(28)SB

This command was integrated into Cisco IOS Release 12.2(28)SB.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The monitor keyword specifies the tty line connections at all line ports. The tty lines (also called ports) communicate with peripheral devices such as terminals, modems, and serial printers. An example of a tty connection is a PC with a terminal emulation program connected to the device using a dial-up modem, or a Telnet connection.

To return system logging messages to standard text (without XML formatting), issue the standard logging monitor command (without the xml keyword extension).

In the following example, the user enables XML-formatted system message logging to the console for messages at levels 0 through 4 and XML-formatted system message logging to tty line connections at the default severity level:

Router(config)# logging console xml 4
Router(config)# logging monitor xml

Related Commands

Command

Description

logging monitor

Enables system message logging in standard (plain text) format to all monitor (TTY) connections.

show logging xml

Displays the state of XML-formatted system message logging, followed by the contents of the XML syslog buffer.

logging on

To enable logging of system messages, use the logging on command in global configuration mode. This command sends debug or error messages to a logging process, which logs messages to designated locations asynchronously to the processes that generated the messages. To disable the logging process, use the no form of this command.

logging on

no logging on

Syntax Description

This command has no arguments or keywords.

Command Default

The Cisco IOS software sends messages to the asynchronous logging process.

Command Modes

Global configuration (config)

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The logging process controls the distribution of logging messages to the various destinations, such as the logging buffer, terminal lines, or syslog server. System logging messages are also known as system error messages. You can turn logging on and off for these destinations individually using the logging buffered, logging monitor, and logging global configuration commands. However, if the logging on command is disabled, no messages will be sent to these destinations. Only the console will receive messages.

Additionally, the logging process logs messages to the console and the various destinations after the processes that generated them have completed. When the logging process is disabled, messages are displayed on the console as soon as they are produced, often appearing in the middle of command output.

UnnamedCaution

Disabling the logging on command may substantially slow down the router. Any process generating debug or error messages will wait until the messages have been displayed on the console before continuing.

The logging synchronous line configuration command also affects the displaying of messages to the console. When the logging synchronous command is enabled, messages will appear only after the user types a carriage return.

The following example shows command output and message output when logging is enabled. The ping process finishes before any of the logging information is printed to the console (or any other destination).

Router(config)# logging on
Router(config)# end
Router#
%SYS-5-CONFIG_I: Configured from console by console
Router# ping dirt

Type escape sequence to abort.
Sending 5, 100-byte ICMP Echos to 172.16.1.129, timeout is 2 seconds:
!!!!!
Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/8 ms
Router#
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1

In the following example, logging is disabled. The message output is displayed as messages are generated, causing the debug messages to be interspersed with the message "Type escape sequence to abort."

Router(config)# no logging on
Router(config)# end
%SYS-5-CONFIG_I: Configured from console by console
Router#
Router# ping dirt

IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sendingTyp
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1e
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sending esc
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sendingape
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sendingse
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1
IP: s=172.21.96.41 (local), d=172.16.1.129 (Ethernet1/0), len 100, sendingquen
IP: s=171.69.1.129 (Ethernet1/0), d=172.21.96.41, len 114, rcvd 1ce to abort.
Sending 5, 100-byte ICMP Echos to 172.16.1.129, timeout is 2 seconds:
!!!!!
Success rate is 100 percent (5/5), round-trip min/avg/max = 152/152/156 ms
Router#

Related Commands

Command

Description

logging host

Logs messages to a syslog server host.

logging buffered

Logs messages to an internal buffer.

logging console

Logs messages to console connections.

logging monitor

Limits messages logged to the terminal lines (monitors) based on severity.

logging synchronous

Synchronizes unsolicited messages and debug output with solicited Cisco IOS software output and prompts for a specific console port line, auxiliary port line, or vty.

logging origin-id

To add an origin identifier to system logging messages sent to remote hosts, use the logging origin-id command in global configuration mode. To disable the origin identifier, use the no form of this command.

logging origin-id {hostname | ip | ipv6 | string user-defined-id}

no logging origin-id

Syntax Description

hostname

Specifies that the hostname will be used as the message origin identifier.

ip

Specifies that the IP address of the sending interface will be used as the message origin identifier.

ipv6

Specifies that the IPv6 address of the sending interface will be used as the message origin identifier.

string user-defined-id

Allows you to enter your own identifying description. The user-defined-id argument is a string you specify.

You can enter a string with no spaces or use delimiting quotation marks to enclose a string with spaces.

Command Default

This command is disabled.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.2(15)T

This command was introduced.

12.3(1)

The string user-defined-id keyword-argument pair was added.

12.3(2)XE

This command was integrated into Cisco IOS Release 12.3(2)XE.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.4(4)T

The ipv6 keyword was added.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2(33)SXH

This command was integrated into Cisco IOS Release 12.2(33)SXH.

12.2(33)SB

This command was integrated into Cisco IOS Release 12.2(33)SB.

Usage Guidelines

The origin identifier is added to the beginning of all system logging (syslog) messages sent to remote hosts. The identifier can be the hostname, the IP address, the IPv6 address, or any text that you specify. The origin identifier is not added to messages sent to local destinations (the console, monitor, or buffer).

The origin identifier is useful for identifying the source of system logging messages in cases where you send syslog output from multiple devices to a single syslog host.

When you specify your own identification string using the logging origin-id string user-defined-id command, the system expects a string without spaces. For example:

Router(config)# logging origin-id string Cisco_Systems

To use spaces (multiple words) or additional syntax, enclose the string with quotation marks (" "). For example:

Router(config)# logging origin-id string "Cisco Systems, Inc."

In the following example, the origin identifier "Domain 1, router B" will be added to the beginning of all system logging messages sent to remote hosts:

Router(config)# logging origin-id string Domain 1, router B

In the following example, all logging messages sent to remote hosts will have the IP address configured for serial interface 1 added to the beginning of the message:

Router(config)# logging host 209.165.200.225

Router(config)# logging trap 5

Router(config)# logging source-interface serial 1

Router(config)# logging origin-id ip

Related Commands

Command

Description

logging host

Enables system message logging to a remote host.

logging source-interface

Forces logging messages to be sent from a specified interface, instead of any available interface.

logging trap

Configures the severity level at or numerically below which logging messages should be sent to a remote host.

logging persistent

To enable the storage of logging messages on the router's advanced technology attachment (ATA) disk, use the logging persistent command in global configuration mode. To disable logging message storage on the ATA disk, use the no form of this command.

logging persistent [batch batch-size] {filesize logging-file-size} [immediate] {notify} [protected] {size filesystem-size} [threshold threshold-capacity[alert]] [url{disk0:/directory | disk1:/directory}]

no logging persistent

Syntax Description

batch batch-size

(Optional) Specifies the batch size in bytes.

Minimum value is 4096.

Maximum value is the total amount of available disk space.

Default value is 4096.

filesize logging-file-size

(Optional) Specifies the size of individual logging files in bytes.

Minimum value is 8192.

Maximum value is the total amount of available disk space.

Default value is 262144.

immediate

(Optional) Writes a new audit record to the log file immediately.

notify

(Optional) Issues a notification when the logging persistent display is activated.

protected

(Optional) Eliminates manipulation on logging-persistent files.

size filesystem-size

(Optional) Specifies the amount of disk space, in bytes, allocated to syslog messages.

Minimum value is 16384.

Maximum value is the total amount of available disk space.

Default value is 10 percent of the total disk space.

threshold threshold-capacity

(Optional) Sets threshold, in percentage, for logging persistence. The threshold capacity ranges from 1 to 99. Default threshold capacity is 95.

alert

(Optional) Issues an audible signal when the threshold is exceeded.

url

(Optional) Specifies any supported local Cisco IOS file system location. The default URL is disk0:/syslog.

disk0: /directory

Indicates the directory on disk 0 where syslog messages are saved. The colon and slash are required.

disk1: /directory

Indicates the directory on disk 1 where syslog messages are saved. The colon and slash are required.

Command Default

The logging messages are not stored in the router's ATA memory.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.0(26)S

This command was introduced.

12.2(25)S

This command was integrated into Cisco IOS Release 12.2(25)S.

12.2(28)SB

This command was integrated into Cisco IOS Release 12.2(28)SB and implemented on the Cisco 10000 series router.

12.2(33)SRB

This command was integrated into Cisco IOS Release 12.2(33)SRB.

12.4(15)T

This command was integrated into Cisco IOS Release 12.4(15)T.

12.4(24)T

The batch keyword and batch-size argument were added.

Cisco IOS XE Release 2.4

This command was modified. The immediate, notify, protected, threshold, and alert keywords, and the threshold-capacity argument, were added.

Usage Guidelines

The logging persistent command enables the storage of syslog data on the router's ATA flash disk. Because the syslog data must be copied from the router's internal memory buffer, you must enable the logging buffered command prior to enabling the logging persistent command.

The filename format of log files is log_MM:DD:YYYY::hh:mm:ss. For example, log_06:10:2008::07:42:14. For Release 12.4(20)T and later releases, the filename format is changed to: log_YYYYMMDD-hhmmss. For example, log_20080610-074214.

UnnamedNote

Any filtering of syslog messages written to the router's internal memory buffer results in filtering of syslog messages written to the router's ATA flash disk.

UnnamedNote

The common criteria condition is specific to ASR 1000 Series Aggregation Services Routers. The protected keyword is supported on the ASR 1000 Series Aggregation Services Routers only.

In the common criteria compliant environment, the logging persistent command is accessible only to the administrator and the audit administrator. The common criteria restrict access to audit information, such as syslog records, to the administrator. The audit administrator alone is allowed to create a persistent logging repository and remove the log files. Use the logging persistent protected command to enable the protected mode of Cisco IOS logging subsystem operation. Once this operation is enabled, access to the persistent audit information is denied to the users of copy, delete, more, and rename generic Cisco IOS commands. The commands format, erase, and partition have no effect if audit information is present on the target device of these commands.

If the immediate keyword is specified, the syslog issues an instruction to immediately write the new audit entry to the log file. If the immediate keyword is not specified, the Cisco IOS peristent logging behavior does not change. By default, the unbuffered mode of operation is turned off.

If a threshold capacity value is not set, the logging policy adheres to a default circular behavior. When the log capacity is reached, the oldest log records are overwritten. Setting a threshold capacity value enables a lossless logging policy.

When the set threshold capacity is reached, the logger issues an alarm for the severity level set in the current logging policy and executes that current logging policy.

Use the logging persistent notify command to create audit trails for administrators who review the audit records. In the common criteria environment, only the administrator can use this command.

The following example shows how to write up to 134,217,728 bytes (128 MB) of logging messages to the syslog directory of disk 0, with a file size of 16,384 bytes and a batch size of 5098 bytes:

Router(config)# logging buffered
Router(config)# logging persistent url disk0:/syslog batch filesize 16384 5098 size 134217728

The following example shows how to enable protected mode of logging subsystem operation with a threshold capacity of 25 percent.

Router> enable
Router# configure terminal
Router(config)# logging persistent protected threshold 25
Router(config)# exit

The following example shows the error message being displayed if the user tries to copy files from and to the log directory when the protected mode is enabled on the logging subsystem:

Router# copy log__persistent_12_22_2007__06_44_05 xxx
%Error parsing filename (Unknown error 0)

Related Commands

Command

Description

logging buffered

Saves syslog messages in router memory.

logging persistent move

To move logging persistent files from one directory to another, use the logging persistent move command in privileged EXEC mode.

logging persistent move [src-url filesystem:/directory] dst-url filesystem :/ directory verbose

Syntax Description

src-url

(Optional) Specifies the source URL from where the files are moved.

filesystem :

Indicates the filesystem, followed by a colon.

/ directory

The directory on the filesystem. The slash is required.

dst-url

Specifies the destination URL to where the files are moved.

verbose

(Optional) Issues a notification every time the file is moved from source to destination.

Command Modes

Privileged EXEC (#)

Command History

Release

Modification

Cisco IOS XE Release 2.4

This command was introduced.

Usage Guidelines

When an audit log is configured on a fixed memory device such as a hard disk or when physical access to the system is not available, the audit administrator can use the logging persistent move command to move files from the audit directory to a designated location. The logging persistent move command organizes the existing log files based on the time of creation and copies one log file at a time to the destination location. If no source location is specified, the log files are moved from the default source location. The default source destination can be specified by using the logging persistent command. The log file at the source destination is deleted after the copy is complete.

This command displays a syslog message when the archiving operation begins.

The following example shows how to move files from the default logging peristent directory to another directory:

Router# logging persistent move dst-url usb0:audit_log_1

 Move persistent logging files from usb0:/audit_log to usb0:/audit_log_1 ? [confirm]
000060: *Jul 26 06:18:17.428: %SYS-6-LOGGING_MOVE: User lab has activated the logging persistent move command.
39 files out of 39 moved from usb0:/audit_log to usb0:/audit_log_1

The following example shows how to move files from the specified logging persistent directory to another directory:

Router# logging persistent move src-url usb0:audit_log_1 dst-url obfl:audit_log

 Move persistent logging files from usb0:/audit_log_1 to obfl:/audit_log ? [confirm]
000061: *Jul 26 06:45:40.691: %SYS-6-LOGGING_MOVE: User lab has activated the logging persistent move command.
39 files out of 39 moved from usb0:/audit_log_1 to obfl:/audit_log

The following example shows how to move files from the source directory to the destination directory with the verbose option enabled:

Router# logging persistent move src-url obfl:audit_log dst-url obfl:audit_log_1 verbose

 Move persistent logging files from obfl:/audit_log to obfl:/audit_log_1 ? [confirm]
000062: *Jul 26 06:50:15.795: %SYS-6-LOGGING_MOVE: User lab has activated the logging persistent move command.
File log_20090723-063200 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-065111 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-071610 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-102105 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-103316 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-110747 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-110928 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-111044 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
File log_20090723-111157 moved from obfl:/audit_log URL to obfl:/audit_log_1 URL.
9 files out of 9 moved from obfl:/audit_log to obfl:/audit_log_1

Related Commands

Command

Description

logging persistent

Enables the storage of logging messages on the router's ATA disk.

logging queue-limit

To control how much system memory may be used for queued log messages, use the logging queue-limit command in global configuration mode. To permit unlimited use of memory for queued log messages, use the no form of this command.

logging queue-limit [queuesize | trap queuesize | esm queuesize]

no logging queue-limit

Syntax Description

queuesize

(Optional) The number of messages in the logger queue. The valid range is 100 to 2147483647. The default is 100.

trap

(Optional) Specifies the limit for the number of log messages that may be queued for a remote system logging (syslog) server and sends the messages to a trap.

esm

(Optional) Specifies the limit for the number of log messages that may be queued for the Embedded Syslog Manager (ESM) subsystem. The size change to the ESM queue will take effect only if the ESM feature is supported in the image and an ESM filter has been configured.

Command Default

100 messages

The default logger queue size varies depending on the hardware platform and is set up by an internal function at run time. The default queue sizes in Cisco IOS Release 12.4(8) are listed as follows. These sizes are subject to change.

Cisco Catalyst 6500 series switches--256 messages

Cisco 7200 platform--250 messages

Cisco AS5400 platform--200 messages

All other Cisco platforms--100 messages

Command Modes

Global configuration (config)

Command History

Release

Modification

12.4(8)

This command was introduced.

12.4(9)T

This command was integrated into Cisco IOS Release 12.4(9)T.

Usage Guidelines

The size of the logging queue affects system memory. In the logging queue, each message has its own memory object. The more messages being queued, the less memory is available for other components of the system to share.

Tuning the queue size is sometimes required when Cisco technical support staff needs to reduce the possibility that logging messages are dropped because the event messages are bursty. The logging queue-limit command is meant for use by Cisco technical support staff assisting on a field-critical case to ensure critical messages are not dropped because of a smaller default queue size.

Customers are discouraged from tuning the message queue size if they have not first contacted the Cisco Technical Support Center (TAC).

UnnamedCaution

When you are tuning the queue size to a larger value, no messages will be dropped. When you relax or remove limits on logger queueing, it is possible to adversely impact the system due to memory, CPU, or network exhaustion.

When the logging queue-limit command is used to reset the logging queue to the default size, it also resets the trap and ESM queues to their default sizes.

The following example sets the logging queue to the system default size:

Router(config)# logging queue-limit

The following example sets the logging queue to 1000 queue entries:

Router(config)# logging queue-limit 1000

The following example removes all logging queue limits:

Router(config)# no
 logging queue-limit

The following example sets the logging queue size at 1000 for messages sent to the ESM:

Router(config)# logging queue-limit esm 1000

The following example sets the logging queue size to 1000 for messages sent to an external syslog:

Router(config)# logging queue-limit trap 1000

Related Commands

Command

Description

logging rate-limit

Limits the rate of messages logged per second.

logging synchronous

Synchronizes unsolicited messages and debug output with solicited Cisco IOS software output and prompts for a specific console port line, auxiliary port line, or vty.

logging trap

Limits messages logged to the syslog servers based on severity.

show logging

Displays the state of the syslog and the contents of the standard system logging buffer.

logging rate-limit

To limit the rate of messages logged per second, use the logging rate-limit command in global configuration mode . To disable the limit, use the no form of this command.

logging rate-limit {number | all number | console {number | all number}} [except severity]

no logging rate-limit

Syntax Description

number

Number of messages to be logged per second. Valid values are 1 to 10000. The default is 10.

all

Sets the rate limit for all error and debug messages displayed at the console and printer.

console

Sets the rate limit for error and debug messages displayed at the console.

except severity

(Optional) Excludes messages of this severity level and lower. Valid levels are 0 to 7.

Severity decreases as the number increases; therefore, severity level 1 indicates a problem more serious than a severity level 3.

Command Default

The default is 10 messages logged per second.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.1(3)T

This command was introduced.

12.2

This command was integrated into Cisco IOS Release 12.2.

12.3

This command was integrated into Cisco IOS Release 12.3.

12.3T

This command was integrated into Cisco IOS Release 12.3T.

12.4

This command was integrated into Cisco IOS Release 12.4.

12.4T

This command was integrated into Cisco IOS Release 12.4T.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2(31)SB

This command was integrated into Cisco IOS Release 12.2(31)SB.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

The logging rate-limit command controls the output of messages from the system. Use this command to avoid a flood of output messages. You can select the severity of the output messages and the output rate by using the logging rate-limit command. You can issue the logging rate-limit command at any time. System performance is not negatively affected and may improve when severities and rates of output messages are specified.

You can use logging rate-limit command with or without the logging synchronous line configuration command. For example, if you want to see all severity 0, 1, and 2 messages, use the no logging synchronous command and specify logging rate-limit 10 except 2. By using the two commands together, you cause all messages of 0, 1, and 2 severity to print and limit the less severe ones (higher number than 2) to only 10 per second.

The table below shows the numeric severity level, equivalent meaning in text, and a description for error messages.

Table 7
Error Message Severity Levels, Equivalent Text, and Descriptions

Numeric Severity Level

Equivalent Word

Description

0

emergencies

System unusable

1

alerts

Immediate action needed

2

critical

Critical conditions

3

errors

Error conditions

4

warnings

Warning conditions

5

notifications

Normal but significant condition

6

informational

Informational messages only

7

debugging

Debugging messages

Cisco 10000 Series Router

To avoid CPU overload and router instability, use the logging rate-limit command to limit the rate at which the Cisco 10000 series router logs system messages. To increase the Point-to-Point Protocol call rate, you can turn off console logging completely using the no logging console command.

The following example shows how to limit message output to 200 per second:

Router(config)# logging rate-limit 200

Related Commands

Command

Description

logging synchronous

Synchronizes unsolicited messages and debug output with solicited Cisco IOS software output and prompts for a specific console port line, auxiliary port line, or vty.

no logging console

Disables syslog message logging to the console terminal.

logging source-interface

To specify the source IPv4 or IPv6 address of system logging packets, use the logging source-interface command in global configuration mode. To remove the source designation, use the no form of this command.

logging source-interface {interface-name number vrf vrf-name}

no logging source-interface {interface-name number vrf vrf-name}

Syntax Description

Interface-name number

Interface type and number.

vrfvrf -name

Provides logging source-interface setting capability to Virtual Routing and Forwarding (VRF) syslog destinations. Name assigned to the VRF.

Command Default

The wildcard interface address is used.

Command Modes

Global configuration (config)

Command History

Release

Modification

11.2

This command was introduced.

12.4(4)T

This command was modified. IPv6 support was added.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

15.1(1)SY

This command was integrated into Cisco IOS Release 15.1(1)SY. The vrf keyword and vrf-name argument were added

Usage Guidelines

This command can be configured on the VRF and non-VRF interfaces. Normally, a syslog message contains the IPv4 or IPv6 address of the interface used to exit the router. The logging source-interface command configures the syslog packets that contain the IPv4 or IPv6 address of a particular interface, regardless of which interface the packet uses to exit the router.

When no specific interface is configured, a wildcard interface address of 0.0.0.0 (for IPv4) or :: (for IPv6) is used, and the IP socket selects the best outbound interface.

The following example shows how to specify that the IP address of Ethernet interface 0 as the source IP address for all syslog messages:

Router(config)# logging source-interface ethernet 0 vrf1

The following example shows how to specify the IP address for Ethernet interface 2/1 as the source IP address for all syslog messages:

Router(config)# logging source-interface ethernet 2/1 vrf1

The following sample output displays that the logging source-interface command is configured on a VRF source interface:

Router# show running interface loopback49

             Building configuration...
             Current configuration : 84 bytes
             !
             interface Loopback49
              ip vrf forwarding vrf1
              ip address 10.4.2.39 255.0.0.0
             end
Router# show running | includes logging
      logging source-interface Loopback49 vrf1
      logging host 192.0.2.1 vrf1

Related Commands

Command

Description

logging

Logs messages to a syslog server host.

logging synchronous

To synchronize unsolicited messages and debug output with solicited Cisco IOS software output and prompts for a specific console port line, auxiliary port line, or vty, use the logging synchronous command in line configuration mode. To disable synchronization of unsolicited messages and debug output, use the no form of this command.

logging synchronous [level severity-level | all] [limit number-of-lines]

no logging synchronous [level severity-level | all] [limit number-of-lines]

Syntax Description

level severity-level

(Optional) Specifies the message severity level. Messages with a severity level equal to or higher than this value are printed asynchronously. Low numbers indicate greater severity and high numbers indicate lesser severity. The default value is 2.

all

(Optional) Specifies that all messages are printed asynchronously, regardless of the severity level.

limit number-of-lines

(Optional) Specifies the number of buffer lines to be queued for the terminal, after which new messages are dropped. The default value is 20.

Command Default

This command is disabled.

If you do not specify a severity level, the default value of 2 is assumed.

If you do not specify the maximum number of buffers to be queued, the default value of 20 is assumed.

Command Modes

Line configuration (config-line)

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

When synchronous logging of unsolicited messages and debug output is turned on, unsolicited Cisco IOS software output is displayed on the console or printed after solicited Cisco IOS software output is displayed or printed. This keeps unsolicited messages and debug output from being interspersed with solicited software output and prompts.

UnnamedTip

This command is useful for keeping system messages from interrupting your typing. By default, messages will appear immediately when they are processed by the system, and the CLI cursor will appear at the end of the displayed message. For example, the line "Configured by console from console" may be printed to the screen, interrupting whatever command you are currently typing. The logging synchronous command allows you to avoid these potentially annoying interruptions without have to turn off logging to the console entirely.

When this command is enabled, unsolicited messages and debug output are displayed on a separate line than user input. After the unsolicited messages are displayed, the CLI returns to the user prompt.

UnnamedNote

This command is also useful for allowing you to continue typing when debugging is enabled.

When specifying a severity level number, consider that for the logging system, low numbers indicate greater severity and high numbers indicate lesser severity.

When a message queue limit of a terminal line is reached, new messages are dropped from the line, although these messages might be displayed on other lines. If messages are dropped, the notice "%SYS-3-MSGLOST number-of-messages due to overflow" follows any messages that are displayed. This notice is displayed only on the terminal that lost the messages. It is not sent to any other lines, any logging servers, or the logging buffer.

UnnamedCaution

By configuring abnormally large message queue limits and setting the terminal to "terminal monitor" on a terminal that is accessible to intruders, you expose yourself to "denial of service" attacks. An intruder could carry out the attack by putting the terminal in synchronous output mode, making a Telnet connection to a remote host, and leaving the connection idle. This could cause large numbers of messages to be generated and queued, and these messages could consume all available RAM. You should guard against this type of attack through proper configuration.

In the following example, a system message appears in the middle of typing the show running-config command:

Router(config-line)# end
Router# show ru
2w1d: %SYS-5-CONFIG_I: Configured from console by consolenning-config
 .
 .
 .

The user then enables synchronous logging for the current line (indicated by the * symbol in the show line command), after which the system displays the system message on a separate line, and returns the user to the prompt to allow the user to finish typing the command on a single line:

Router# show line

   Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int
*    0 CTY              -    -      -    -    -      0       3     0/0       -
 .
 .
 .
Router# configure terminal
Enter configuration commands, one per line.  End with CNTL/Z.
Router(config)# line 0
Router(config-line)# logging syn
<tab>
Router(config-line)# logging synchronous

Router(config-line)# end

Router# show ru

2w1d: %SYS-5-CONFIG_I: Configured from console by console
Router# show running-config

In the following example, synchronous logging for line 4 is enabled with a severity level of 6. Then synchronous logging for line 2 is enabled with a severity level of 7 and is specified with a maximum number of buffer lines of 1,000.

Router(config)# line 4
Router(config-line)# logging synchronous level 6
Router(config-line)# exit
Router(config)# line 2
Router(config-line)# logging synchronous level 7 limit 1000
Router(config-line)# end
Router#

Related Commands

Command

Description

line

Identifies a specific line for configuration and starts the line configuration command collection mode.

logging on

Controls logging of error messages and sends debug or error messages to a logging process, which logs messages to designated locations asynchronously to the processes that generated the messages.

logging trap

To limit messages logged to the syslog servers based on severity, use the logging trap command in global configuration mode . To return the logging to remote hosts to the default level, use the no form of this command.

logging trap level

no logging trap

Syntax Description

severity-level

(Optional) The number or name of the desired severity level at which messages should be logged. Messages at or numerically lower than the specified level are logged. Severity levels are as follows (enter the number or the keyword):

[0 | emergencies]--System is unusable

[1 | alerts]--Immediate action needed

[2 | critical]--Critical conditions

[3 | errors]--Error conditions

[4 | warnings]--Warning conditions

[5 | notifications]--Normal but significant conditions

[6 | informational]--Informational messages

[7 | debugging]--Debugging messages

Command Default

Syslog messages at level 0 to level 6 are generated, but will only be sent to a remote host if the logging host command is configured.

Command Modes

Global configuration

Command History

Release

Modification

10.0

This command was introduced.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SX

This command is supported in the Cisco IOS Release 12.2SX train. Support in a specific 12.2SX release of this train depends on your feature set, platform, and platform hardware.

Usage Guidelines

A trap is an unsolicited message sent to a remote network management host. Logging traps should not be confused with SNMP traps (SNMP logging traps require the use of the CISCO -SYSLOG-MIB, are enabled using the snmp-server enable traps syslog command, and are sent using the Simple Network Management Protocol.)

The show logging EXEC command displays the addresses and levels associated with the current logging setup. The status of logging to remote hosts appears in the command output as "trap logging".

The table below lists the syslog definitions that correspond to the debugging message levels. Additionally, four categories of messages are generated by the software, as follows:

Error messages about software or hardware malfunctions at the LOG_ERR level.

Output for the debug commands at the LOG_WARNING level.

Interface up/down transitions and system restarts at the LOG_NOTICE level.

Reload requests and low process stacks at the LOG_INFO level.

Use the logging host and logging trap commands to send messages to a remote syslog server.

Table 8
logging trap Error Message Logging Priorities

Level Arguments

Level

Description

Syslog Definition

emergencies

0

System unusable

LOG_EMERG

alerts

1

Immediate action needed

LOG_ALERT

critical

2

Critical conditions

LOG_CRIT

errors

3

Error conditions

LOG_ERR

warnings

4

Warning conditions

LOG_WARNING

notifications

5

Normal but significant condition

LOG_NOTICE

informational

6

Informational messages only

LOG_INFO

debugging

7

Debugging messages

LOG_DEBUG

In the following example, system messages of levels 0 (emergencies) through 5 (notifications) are sent to the host at 209.165.200.225:

Router(config)# logging host 209.165.200.225
Router(config)# logging trap notifications
Router(config)# end
Router# show logging

Syslog logging: enabled (0 messages dropped, 1 messages rate-limited,
                0 flushes, 0 overruns, xml disabled, filtering disabled)
    Console logging: level emergencies, 0 messages logged, xml disabled,
                     filtering disabled
    Monitor logging: level debugging, 0 messages logged, xml disabled,
                     filtering disabled
    Buffer logging: level debugging, 67 messages logged, xml disabled,
                    filtering disabled
    Logging Exception size (4096 bytes)
    Count and timestamp logging messages: enabled
    Trap logging: level notifications
, 71 message lines logged
Log Buffer (4096 bytes):
00:00:20: %SYS-5-CONFIG_I: Configured from memory by console
 .
 .
 .

Related Commands

Command

Description

logging host

Enables remote logging of system logging messages and specifies the syslog server host that messages should be sent to.

logging userinfo

To enable the logging of user information, use the logging userinfo command in global configuration mode. To cancel the logging of user information, use the no form of this command.

logging userinfo

no logging userinfo

Syntax Description

This command has no arguments or keywords.

Command Default

User information logging is disabled by default.

Command Modes

Global configuration (config)

Command History

Release

Modification

12.0S

This command was introduced.

12.3(14)T

This command was integrated into Cisco IOS Release 12.3(14)T.

12.2(33)SRA

This command was integrated into Cisco IOS Release 12.2(33)SRA.

12.2SXH2

This command was integrated into Cisco IOS Release 12.2SXH2.

Usage Guidelines

The logging userinfo global configuration command allows the logging of user information when the user invokes the enable privilege mode or when the user changes the privilege level. The user can change the privilege level of a terminal session by using the enable and the disable command.

Information logged includes username, line (for example, Console and vty0), and privileged level (for example, 0 to 15).

UnnamedNote

When a username is not available, "unknown" is displayed as the username.

The following example shows how to enable user information logging:

Router# configure terminal

Router(config)# logging userinfo
Router(config)# exit

The following are two examples of user information logging using the enable and disable commands:

Router> enable 15
Password:
Router#
*Feb 26 17:11:15.398: %SYS-5-PRIV_AUTH_PASS: Privilege level set to 15 by cisco)

The enable command allows the user to enter a desired privilege level.

Router# disable 6
Router#
*Feb 26 17:12:28.922: %SYS-5-PRIV_AUTH_PASS: Privilege level set to 6 by cisco)

The disable command allows the user to enter a desired privilege level.

Related Commands

Command

Description

disable

Exits from privileged EXEC mode to user EXEC mode, or, if privilege levels are set, exits to the specified privilege level.

enable

Enables higher privilege level access, such as privileged EXEC mode.

privilege level (global)

Sets a privilege level for a command.

privilege level (line)

Sets a privilege level for a command for a specific line.

show logging persistent

To display the contents of the logging persistent files, use the show logging persistent command in privileged EXEC mode.

show logging persistent [url filesystem : location] [selector-url filesystem : filename]

Syntax Description

url

(Optional) Specifies the URL to display logging messages.

filesystem :

The URL or alias of the file system followed by a colon.

location

The audit folder location.

selector-url

(Optional) Specifies the URL or location for the search parameters file.

filename

The URL or alias of the search parameters file.

Command Modes

Privileged EXEC (#)

Command History

Release

Modification

Cisco IOS XE Release 2.4

This command was introduced.

Usage Guidelines

To display the contents of the logging persistent files based on specific parameters in the syslog messages, you need to conduct a search on the syslog messages. In order to reduce the data input complexity, the show logging persistent command calls for a URL of a search parameters file, which contains a collection of search and sorting rules.

The search parameters file comprise three sections: search templates, search patterns, and sorting rules. These sections are described in the following text.

Search Templates

Search templates are constructed by using logical expressions and value rules. Value rules are methods of locating the beginning and ending of the object's value. The search templates along with value rules are used to locate objects in the syslog messages and to extract the objects' value.

The table below provides the definition of value rules for a list of search objects that can be used to construct search templates.

Table 9
Value Rules for Object Types

Object Type

Value Rules

AUDIT_RECORD_DATE

Fixed format field.

AUDIT_RECORD_TIME

Fixed format field.

FW_DROP_PKT_CAUSE

Finds the first alphanumeric value; stops at the first nonalphanumeric value or underscore ("_") symbol.

INTERFACE_NAME

Finds the first alphanumeric value; stops at the first nonalphanumeric value or a symbol that is not a slash ("/") or a period (".").

L4_PROTO_ID

Finds the first alphanumeric value; stops at the first nonalphanumeric value.

L4_PROTO_ID_RANGE

Finds the first numeric value; stops at the first nonnumeric value.

RULE_IDENTITY

Finds the first alphanumeric value; stops at the colon symbol (":").

RULE_IDENTITY_PLATFORM

Finds the first alphanumeric value; stops at the colon symbol (":").

SOURCE_SUBJECT DESTINATION_SUBJECT

IPv4: Finds the first numeric value; includes the substring containing number or period (".'') ; stops at the first nonnumeric value or nonperiod ("."); trims the trailing period ("."), if any.

IPv6: Finds the first numeric value; includes the substring containing numbers or periods (".'') ; stops at first nonnumeric value or non-period ("."); trims the trailing period ("."), if any.

SUBJECT_SERVICE_ID

Finds the first alphanumeric value; stops at the first nonalphanumeric value.

SUBJECT_SERVICE_ID_RANGE

Finds the first numeric value; stops at the first nonnumeric value.

USER_ID

Finds the first alpha symbol; stops at the first nonalphanumeric symbol

Syntax for Search Templates

Search templates for all types of objects are strings enclosed in quotes ("..."). If you provide multiple search templates on the same line, a search is performed for each of the search template in the left-to-right order (by using the logical operation OR).

You can provide arbitrary search templates for all object types except the following: AUDIT_RECORD_DATE, AUDIT_RECORD_TIME, RULE_IDENTITY, and RULE_IDENTITY_PLATFORM.

Search templates of the AUDIT_RECORD_DATE, AUDIT_RECORD_TIME, RULE_IDENTITY, and RULE_IDENTITY_PLATFORM, objects are hard coded because the location and the format of these objects in the Cisco IOS syslog messages are fixed.

The general syntax for the search template is:

<object_id>:
<logical-expression>

For example, the following syntax searches for user:, username, or user in the sylog messages and equates it to USER_ID.

USER_ID: "user:" "username" "user"

Search Patterns

A search pattern is a regular expression (regexp) for selecting a subset of objects of a given type or a range of values.

Syntax for Search Patterns

The table below lists the syntax for search patterns of various types of objects:

Table 10
Syntax for Search Patterns

Object Type

Syntax

Example

AUDIT_RECORD_DATE

YYYY-MM-DD[:YYYY-MM-DD]

AUDIT_RECORD_DATE:2009-01-03
AUDIT_RECORD_DATE:2009-01-03:2009-02-04

AUDIT_RECORD_TIME

HH:MM:SS[-HH:MM:SS]

AUDIT_RECORD_TIME:22:30:33
AUDIT_RECORD_TIME:22:30:33-23:30:00

FW_DROP_PKT_CAUSE

Regular expression with double quotes ("...")

FW-DROP-PKT_CAUSE: "POLICY"

INTERFACE_NAME

Regular expression with double quotes ("...")

INTERFACE_NAME: "FastEthernet0/1/2\.1|Gig*"

L4_PROTO_ID

Regular expression with double quotes ("...")

L4_PROTO_ID: "tcp"

L4_PROTO_ID_RANGE

Numeric value or numeric range without double quotes ("...")

L4_PROTO_ID_RANGE:6
L4_PROTO_ID_RANGE:8 - 9

RULE_IDENTITY

Regular expression with double quotes ("...")

RULE_IDENTITY: "SEC_LOGIN\-4\-LOGIN_FAILED|SEC_LOGIN\-5\-LOGIN_SUCCESS"

RULE_IDENTITY_PLATFORM

Regular expression with double quotes ("...")

RULE_IDENTITY_PLATFORM: "FW\-6\-DROP_PKT"

SOURCE_SUBJECT, DESTINATION_SUBJECT

Regular expression without double quotes ("...")

SOURCE_SUBJECT: "192\.168\.1\.*|192\.168\.2.\2?"

SUBJECT_SERVICE_ID

Regular expression with double quotes ("...")

SUBJECT_SERVICE_ID: "telnet|ssh|22"

SUBJECT_SERVICE_ID_RANGE

Numeric value or numeric range without double quotes ("...")

SUBJECT_SERVICE_ID_RANGE:5
SUBJECT_SERVICE_ID_RANGE:5-122

USER_ID

Case insensitive regular expression with double quotes ("...")

USER_ID: "alice|Bob"

Sorting Rules

The sorting rules instruct how to sort the selected subset. The sorting rule is specified as a search object ID followed by a sort-order specifier, which is either ASCENDING or DESCENDING.

Syntax for Sorting Rules

The general syntax for the sorting rules is:

<object_id>: ASCENDING | DESCENDING

For example, the following syntax sorts the user IDs in an ascending order:

USER_ID: ASCENDING

Search Parameters File

The search parameters file contains a search template, search patterns, and sorting rules. Each section of a search parameters file begins with a header and ends with footer. The general syntax for the search parameters file is as follows:

<SEARCH TEMPLATES>
... search-templates here...
</SEARCH TEMPLATES>
<SEARCH PATTERNS>
...search-patterns here...
</SEARCH PATTERNS>
<SORT RULES>
... sort-rules here...
</END SORT RULES>

Search Parameters File: Example

The following example shows how to construct search parameters for finding all audit records sorted by the user, between 9/17/2009 and 9/21/2009, captured between 1:00 a.m. and 4:00 a.m. on those dates, which belong to usernames testuser1 or testuser2, and are attempts to initiate a telnet or console connection.

The following syslog messages appear in the output:

*Sep 19 02:46:02.173: %SEC_LOGIN-5-LOGIN_SUCCESS: Login Success [user: testuser1] [Source: 172.27.53.101] [localport: 22] at 02:46:02 UTC Wed Sep 19 2001

*Sep 19 02:46:51.359: %SEC_LOGIN-4-LOGIN_FAILED: Login failed [user: testuser1] [Source: 172.27.53.101] [localport: 22] [Reason: Login Authentication Failed] at 02:46:51 UTC Wed Sep 19 2001

*Sep 19 03:26:28.721: %SEC_LOGIN-5-LOGIN_SUCCESS: Login Success [user: testuser2] [Source: 0.0.0.0] [localport: 0] at 03:26:28 UTC Wed Sep 19 2001

The search parameters file for this example is constructed as follows:

<SEARCH TEMPLATES>
USER_ID: "user:"
SUBJECT_SERVICE_ID: "localport:"
</SEARCH TEMPLATES>
<SEARCH PATTERNS>
RULE_IDENTITY: "SEC_LOGIN\-5\-LOGIN_SUCCESS" "SEC_LOGIN\-4\-LOGIN_FAILED"
USER_ID: "Alice|Bob"
SUBJECT_SERVICE_ID: "0|22"
AUDIT_RECORD_DATE: 2009-09-17:2009-09-21
AUDIT_RECORD_TIME: 01:00:00 - 03:59:59
</SEARCH PATTERNS>
<SORT RULES>
USER_ID: ASCENDING
</SORT RULES>

The url filesystem : location keyword and argument combination specifies the audit folder location. If you do not specify these attributes, a default audit folder location is used. The default audit folder location is defined using the logging persistent command.

If you do not specify the selector-url filesystem : filename keyword and argument combination, the viewer displays log files in a chronological order.

The following is sample output from the show logging persistent command:

Router# show logging persistent

000070: *Feb 17 01:22:24.147: %PARSER-6-EXPOSEDLOCKACQUIRED: Exclusive configuration lock acquired by user 'test' from terminal '0'  -Process= "Exec", ipl= 0, pid= 3
000071: *Feb 17 01:22:24.979: %SYS-5-CONFIG_I: Configured from console by ena on console
000072: *Feb 17 01:22:24.979: %PARSER-6-EXPOSEDLOCKRELEASED: Exclusive configuration lock released from terminal '0' -Process= "Exec", ipl= 0, pid= 3
000073: *Feb 17 02:45:17.201: %PARSER-6-EXPOSEDLOCKACQUIRED: Exclusive configuration lock acquired by user 'test' from terminal '0'  -Process= "Exec", ipl= 0, pid= 3
Router#
000074: *Feb 18 05:49:19.443: %SYS-6-SHOW_LOGGING_PERSISTENT: User test has activated the show logging persistent command.

The following example shows how to specify the location of the search parameters file "filter_rule_id" from bootflash. The syslog messages are sorted using the search parameters specified in the "filter_rule_id" file and the contents are displayed in the output. In this case, the search parameters specify the system to search for audit records sorted by the "testu1" user for the date 08/31/09.

Router# show logging persistent selector-url bootflash:filter_rule_id_pl

*Aug 31 19:35:37.540: %SEC_LOGIN-5-LOGIN_SUCCESS: Login Success [user: testu1] [Source: 0.0.0.0] [localport: 0] at 19:35:37 UTC Fri Aug 31 2009
*Aug 31 19:35:54.385: %PARSER-6-EXPOSEDLOCKACQUIRED: Exclusive configuration lock acquired by user 'testu1' from terminal '0'  -Process= "Exec", ipl= 0, pid= 96 (note: includes space and apostrophe)

The following example shows how to display syslog messages from an audit folder location:

Router# show logging persistent url bootflash:test_location

000070: *Feb 17 01:22:24.147: %PARSER-6-EXPOSEDLOCKACQUIRED: Exclusive configuration lock acquired by user 'test' from terminal '0'  -Process= "Exec", ipl= 0, pid= 3
000071: *Feb 17 01:22:24.979: %SYS-5-CONFIG_I: Configured from console by test onconsole
Router#
000074: *Feb 18 05:49:19.443: %SYS-6-SHOW_LOGGING_PERSISTENT: User test has activated the show logging persistent command.

Related Commands

Command

Description

clear logging

Clears messages from the logging buffer.

logging persistent

Enables the storage of logging messages on the router's ATA disk.